IVS-Kermit cOmpilation instructions:

From an IVS session or SCL procedure file:

REC (L=2500,V=1500,STAC=250,PROT=600);

CC(FN=FILENAME_C,LNK=NO,OPTM=TRUE,GLBOPT='-R -o FILENAME_O',
   POPT='-bo -X1',COPT='-b -Xv');!"

***NOTE***
	IVS-Kermit object modules end in _O. MCS-Kermit modules
        end in _M. This is done to separate MCS-Kermit object
        from IVS-Kermit object. There are several common object
        modules between MCS / IVS-Kermit, they do not require the
        _M convention. Any naming convention is exceptable,
        as long as the modules are separated.
        The common object modules are listed below.

        Common object modules:

          BIND=CKVFN2_O
          BIND=CKVFNS_O
          BIND=CKVFI2_O
          BIND=CKVFIO_O
          BIND=VKNCRLIO  NCRL source module
          BIND=CKVMCS_O  *** COMPILE USING IVS INSTRUCTIONS
          BIND=CKVBUF_O  *** COMPILE USING IVS INSTRUCTIONS

MCS-Kermit compilation instructions:

From an IVS session or SCL procedure file:

REC (L=2500,V=1500,STAC=250,PROT=600);

CC(FN=FILENAME_C,LNK=NO,OPTM=TRUE,GLBOPT='-R -o FILENAME_M',
   POPT='-bo -X1 -D MCS_FLAG',COPT='-b -Xv');!"
